\bib{1979/knight}
\yr 1979
\by William R. Knight
\by R. Kaiser
\paper A simple fixed-point error bound for the fast Fourier transform
\jour IEEE Transactions on Acoustics, Speech, and Signal Processing
\issn 0096--3518
\vol 27
\pages 615--620
\endref
