\bib{2005/cohen-ehcc}
\yr 2005
\editor Henri Cohen
\editor Gerhard Frey
\book Handbook of elliptic and hyperelliptic curve cryptography
\publ CRC Press
\isbn 1--58488--518--1
\endref
